)σ (_{el}

TPC dE/dx - <TPC dE/dx>|

-8 -6 -4 -2 0 2

Counts

1

10

210 3 GeV/c < p < 4 GeV/c Data Combined Fit Electron Fit Pion/Muon Fit Kaon/Proton Fit

= 7 TeV s pp,